)θ Cos(

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1

1.2 Ratio between observed data and plot, kaons / ndf2χ 23.02 / 46 p0 0.007483 ± 0.9905

Ratio between observed data and plot, kaons