0θ 1.2 1.25 1.3 1.35 1.4 1.45

|y)_0θp(

0

6

12

18

24

30 = 0.1 τ exponential, 0.5 ≤ _1θ≤ uniform, 0 0≥ _1θ

= 0.1, σ half-Gaussian,