BDSSynchRadPhysics

- _srProcess - _contSR - _wasActivated

+ BDSSynchRadPhysics() + ~BDSSynchRadPhysics() + ConstructProcess() + ConstructParticle()

BDSSynchrotronRadiation

- nExpConst - CritEngFac - MeanFreePathCounter

+ BDSSynchrotronRadiation() + ~BDSSynchrotronRadiation() + IsApplicable() + GetMeanFreePath() + PostStepDoIt() + SynGenC() + SynRadC() - operator=() - BDSSynchrotronRadiation()

_srProcess

BDSContinuousSR

- nExpConst - CritEngFac

+ BDSContinuousSR() + ~BDSContinuousSR() + IsApplicable() + GetMeanFreePath() + PostStepDoIt() + SynGenC() + SynRadC() - operator=() - BDSContinuousSR()

_contSR