BDS::CheckApertureInfo BDS::InfoOKForCircular

BDS::InfoOKForElliptical

BDS::InfoOKForRectangular

BDS::InfoOKForLHC

BDS::InfoOKForLHCDetailed BDS::InfoOKForRectEllipse